create table ElectricEnergy (
    id int(10) unsigned not null auto_increment,
    name varchar(64) not null,
    ts timestamp not null,
    energy int(10) unsigned not null,
    power int(10) unsigned not null,
    primary key (id) 
) engine=InnoDB;

create table Temperature (
    id int(10) unsigned not null auto_increment,
    name varchar(64) not null,
    ts timestamp not null,
    temperature double not null,
    primary key (id) 
) engine=InnoDB;

