:repository-owner: arduino-libraries
:repository-name: ArduinoRS485

= {repository-name} Library for Arduino =

image:https://github.com/{repository-owner}/{repository-name}/actions/workflows/check-arduino.yml/badge.svg["Check Arduino status", link="https://github.com/{repository-owner}/{repository-name}/actions/workflows/check-arduino.yml"]
image:https://github.com/{repository-owner}/{repository-name}/actions/workflows/compile-examples.yml/badge.svg["Compile Examples status", link="https://github.com/{repository-owner}/{repository-name}/actions/workflows/compile-examples.yml"]
image:https://github.com/{repository-owner}/{repository-name}/actions/workflows/spell-check.yml/badge.svg["Spell Check status", link="https://github.com/{repository-owner}/{repository-name}/actions/workflows/spell-check.yml"]

Enables sending and receiving data using the RS-485 standard with RS-485 shields, like the MKR 485 Shield.

This library supports the Maxim Integrated MAX3157 and equivalent chipsets.

For more information about this library please visit us at
http://www.arduino.cc/en/Reference/{repository-name}
